From ce34df080d3774cf996b6791d2eb0d959cdd36ef Mon Sep 17 00:00:00 2001
From: Arjun Satarkar <me@arjunsatarkar.net>
Date: Mon, 1 Jan 2024 23:42:46 +0530
Subject: Fix broken link in README

---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index dd08142..118073f 100644
--- a/README.adoc
+++ b/README.adoc
@@ -1,6 +1,6 @@
 = Terminal LCD Clock
 
-A simple justified time and date LCD-like display using https://github.com/pwaller/pyfiglet:[pyfiglet] and curses.
+A simple justified time and date LCD-like display using https://github.com/pwaller/pyfiglet[pyfiglet] and curses.
 
 image::https://scm.arjunsatarkar.net/terminal-lcd-clock/plain/example.png[Screenshot]
 
-- 
cgit v1.2.3-57-g22cb

